From b6c6b705c15ff02e26eb5463a8b1550fa131ee38 Mon Sep 17 00:00:00 2001
From: axtloss <axtlos@disroot.org>
Date: Tue, 20 Aug 2024 23:22:50 +0200
Subject: add loader for long loading pages

---
 src/routes/projects/+page.svelte | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/routes/projects/+page.svelte')

diff --git a/src/routes/projects/+page.svelte b/src/routes/projects/+page.svelte
index dbe5516..05c013f 100644
--- a/src/routes/projects/+page.svelte
+++ b/src/routes/projects/+page.svelte
@@ -16,7 +16,7 @@
 
   <ProjectEntry name={'BVG - Basic Vector Graphics'} description={'Custom made vector graphic format for use with FsVerify, the parser (fbwarn) is written in C using raylib'}
 		projType={'Personal Project'} link={'https://github.com/axtloss/fsverify/tree/main/fbwarn'}>
-    <img  src="/bvg.png" alt="The FsVerify logo drawn with BVG"/>
+    <img src='/bvg.png' alt="The FsVerify logo drawn with BVG"/>
   </ProjectEntry>
 
   <ProjectEntry name={'vib'} description={'Building docker images using yaml recipes, written in golang'}
-- 
cgit v1.2.3

